<p>1 of 1 Custom Beretta</p>
<p>Beretta M9A3</p>
<p>9mm Compensated</p>
<p>Custom Negrini Pistol Case</p>
<p> </p>
<p><span style="text-decoration:underline;"><strong>FINISH:</strong></span></p>
<ul>
<li>Case Hardened: Slide + Small Parts</li>
<li>Graphite Gray PVD Coated: Frame, Compensator, Guide Rod, Barrel, Decocker, Magazine Basepads</li>
<li>Nickel Boron NP3: Billennium SAO Trigger Shoe + Extractor</li>
<li>DLC Black PVD Coated: Magazine Bodies</li>
<li>Brass: LokGrips USPSA Brass Weight w/ Light</li>
<li>Stainless (INOX): Grip Screws</li>
<li>Anozided Black: Beretta 92 Vertec Aluminum Grips + Springer Precision Magwell</li>
</ul>
<p><span style="text-decoration:underline;"><strong>PARTS:</strong></span></p>
<ul>
<li>Beretta 92-G Decocker Kit</li>
<li>Beretta 92 Steel Oversized Magazine Catch</li>
<li>Beretta 92 Vertec OEM Aluminum Textured Grips (Modified to Fit Slide Catch)</li>
<li>UNOBTAINIUM - Beretta 92 Billennium SAO Trigger Shoe + Extractor</li>
<li>DISCONTINUED - Beretta 92 Match Self-Locking Takedown Lever</li>
<li>DISCONTINUED - Beretta 92 Match Extended Slide Catch</li>
<li>Dawson Precision Tall Fiber Optic Front Sight</li>
<li>LPA Target Adjustable Rear Sight</li>
<li>Langdon Tactical Trigger Job Kit w/ Match Hammer</li>
<li>LokGrips Brass USPSA Competition Weight w/ Light (Modified to work with Free-Float Compensator)</li>
<li>RICS SGS Compensator (Non-Threaded Free-Floating Comp) + Extended Stainless Steel Guide Rod</li>
<li>MEC-GAR Beretta 92 18-Round Magazines (Capped to 10 Rounds)</li>
<li>Springer Precision Tactical Magwell</li>
<li>Springer Precision 140mm Aluminum Basepads</li>
<li>Wilson Combat Beretta 92 Guide Rod Buffer Pad</li>
</ul>